<template>
    <UModal v-bind="$props" title="Connect Komga">
        <template #body>
            <UFormField label="URL">
                <UInput v-model="requestData.url" placeholder="https://" class="w-full" :disabled="busy" />
            </UFormField>
            <UFormField label="Username">
                <UInput v-model="requestData.username" class="w-full" :disabled="busy" />
            </UFormField>
            <UFormField label="Password">
                <UInput v-model="requestData.password" type="password" class="w-full" :disabled="busy" />
            </UFormField>
            <UButton icon="i-lucide-link" :class="['mt-2 float-right', success == false ? 'animate-[shake_0.2s] bg-error' : '' ]" :loading="busy" :disabled="busy || !allowSend" @click="connect">Connect</UButton>
        </template>
    </UModal>
</template>

<script setup lang="ts">
import type { components } from '#open-fetch-schemas/api';
type CreateLibraryConnectorRecord = components['schemas']['CreateLibraryConnectorRecord'];
const { $api } = useNuxtApp();

const requestData = ref<CreateLibraryConnectorRecord>({
    libraryType: 'Komga',
    url: '',
    username: '',
    password: ''
});

const allowSend = computed(() => requestData.value.url && requestData.value.username && requestData.value.password);

const busy = ref<boolean>(false);
const success = ref<boolean | undefined>(undefined);
const emit = defineEmits<{ close: [boolean] }>()
const connect = async () => {
    busy.value = true;
    try {
        await $api("/v2/LibraryConnector", { method: "PUT", body: requestData.value });
        await refreshNuxtData(FetchKeys.Libraries.All);
        emit('close', false);
        success.value = true;
    }catch {
        success.value = false;
        setTimeout(() => success.value = undefined, 200);
    }finally {
        busy.value = false;
    }
}
</script>
